---
sidebar_position: 4
---

# Range Mode

Set the `mode` prop to `"range"` to enable the selection of a continuous range of dates in DayPicker.

```tsx
<DayPicker mode="range" />
```

<BrowserWindow sourceUrl="https://github.com/gpbl/react-day-picker/blob/main/examples/Range.tsx">
  <Examples.Range />
</BrowserWindow>

## Range Mode Props

| Prop Name         | Type                                                                                | Description                                |
| ----------------- | ----------------------------------------------------------------------------------- | ------------------------------------------ |
| `selected`        | [`DateRange`](../api/type-aliases/DateRange.md)                                     | The selected range.                        |
| `onSelect`        | [`OnSelectHandler<DateRange \| undefined>`](../api/type-aliases/OnSelectHandler.md) | Event callback when a date is selected.    |
| `required`        | `boolean`                                                                           | Make the selection required.               |
| `min`             | `number`                                                                            | The minimum number of nights in the range. |
| `max`             | `number`                                                                            | The maximum number of nights in the range. |
| `excludeDisabled` | `boolean`                                                                           | Exclude disabled dates from the range.     |

## Min and Max Dates

By default, a range can have a length of 0 nights, meaning the start date can be the same as the end date. Use the `min` prop to set the minimum number of nights. The range will remain "open" until at least the `min` number of nights are selected.

Similarly, use the `max` prop to set the maximum number of nights.

```tsx
<DayPicker mode="range" min={1} max={6} />
```

<BrowserWindow bodyStyle={{ justifyContent: "start" }} sourceUrl="https://github.com/gpbl/react-day-picker/blob/main/examples/RangeMinMax.tsx">
  <Examples.RangeMinMax />
</BrowserWindow>

## Required Ranges

By setting the `required` prop, DayPicker ensures that the selected range cannot be unselected.

```tsx
<DayPicker mode="range" required />
```

<BrowserWindow sourceUrl="https://github.com/gpbl/react-day-picker/blob/main/examples/RangeRequired.tsx">
  <Examples.RangeRequired />
</BrowserWindow>

## Excluding Disabled Dates {#exclude-disabled}

In `range` mode, disabled dates are included in the selected range by default. To exclude disabled dates from the range, use the `excludeDisabled` prop. If a disabled date is selected, the range will reset.

```tsx
<DayPicker
  mode="range"
  // Disable weekends
  disabled={{ dayOfWeek: [0, 6] }}
  // Reset range when a disabled date is included
  excludeDisabled
/>
```

<BrowserWindow sourceUrl="https://github.com/gpbl/react-day-picker/blob/main/examples/RangeExcludeDisabled.tsx">
  <Examples.RangeExcludeDisabled />
</BrowserWindow>
