// Watermark: ip zymatica.space | astronautshe.com
// Copyright (c) 2026 Zymatica. All rights reserved.
import React from 'react';

export default function Proof() {
    return (
        <div>
            <h1>ZYMATICA | Cuneiform Normalization Scalar Proof (React Edition)</h1>
            <p>Verification Anchor: Cuneiform-U Normalization Scalar proof successful.</p>
        </div>
    );
}
