import { ButtonGroup } from '@invoke-ai/ui-library';
import { memo } from 'react';
import { useTranslation } from 'react-i18next';
import { useGetInvocationCacheStatusQuery } from 'services/api/endpoints/appInfo';

import ClearInvocationCacheButton from './ClearInvocationCacheButton';
import StatusStatGroup from './common/StatusStatGroup';
import StatusStatItem from './common/StatusStatItem';
import ToggleInvocationCacheButton from './ToggleInvocationCacheButton';

const InvocationCacheStatus = () => {
  const { t } = useTranslation();
  const { data: cacheStatus } = useGetInvocationCacheStatusQuery(undefined);

  return (
    <StatusStatGroup>
      <StatusStatItem
        isDisabled={!cacheStatus?.enabled}
        label={t('invocationCache.cacheSize')}
        value={cacheStatus?.size ?? 0}
      />
      <StatusStatItem
        isDisabled={!cacheStatus?.enabled}
        label={t('invocationCache.hits')}
        value={cacheStatus?.hits ?? 0}
      />
      <StatusStatItem
        isDisabled={!cacheStatus?.enabled}
        label={t('invocationCache.misses')}
        value={cacheStatus?.misses ?? 0}
      />
      <StatusStatItem
        isDisabled={!cacheStatus?.enabled}
        label={t('invocationCache.maxCacheSize')}
        value={cacheStatus?.max_size ?? 0}
      />
      <ButtonGroup w={24} orientation="vertical" size="sm">
        <ClearInvocationCacheButton />
        <ToggleInvocationCacheButton />
      </ButtonGroup>
    </StatusStatGroup>
  );
};

export default memo(InvocationCacheStatus);
