import { HTMLAttributes } from "react";

export default function FirecrawlIcon({
  fill = "var(--heat-100)",
  innerFillColor = "var(--background-base)",
  ...attrs
}: HTMLAttributes<HTMLOrSVGElement> & {
  innerFillColor?: string;
  fill?: string;
}) {
  return (
    <svg
      {...attrs}
      height="600"
      preserveAspectRatio="xMidYMid meet"
      viewBox="0 0 600 600"
      width="600"
      xmlns="http://www.w3.org/2000/svg"
    >
      <g>
        <g transform=" translate(293.035, 553.013) scale(0.97724, 0.97724) translate(-533.035, -800.013)">
          <path
            d=" M603.36 416.33 C581,433 586.63,450.25 583.86,466.55 C583.19,470.47 577.75,469.25 576.54,465.71 C559.5,447 549.55,423.61 559.33,394.37 C577.25,340.75 614.25,311.25 594.16,288.45 C590.97,284.83 591.83,284.26 590.22,288.82 C572.5,339 363,338 427.98,536 C430.85,544.77 430.25,555.25 429.51,565.8 C429.28,568.95 427.08,571.32 424.17,570.12 C401.5,560.75 395.38,525.75 390.42,516.28 C389,513.58 387.5,514.5 385.67,517.95 C381.03,524.07 377.94,532.3 374.2,538.54 C336.92,600.69 343.58,664.33 368.03,714.96 C368.94,716.86 369.89,718.74 370.85,720.6 C371.93,722.68 373.05,724.75 374.19,726.79 C391.8,758.26 416.04,783.76 439.75,799.32 C442.6,801.19 446.26,798.52 445.29,795.24 C437.07,767.62 642.75,744.75 634.67,795.2 C634.12,798.62 637.29,801.28 640.2,799.38 C659.88,786.47 680.25,766.82 695.21,741.99 C696.41,740.01 697.57,737.99 698.7,735.93 C699.47,734.52 700.23,733.09 700.97,731.65 C711.2,711.65 717.8,688.75 718.09,663.65 C718.33,643.75 714.58,622.45 705.52,600.11 C703.78,595.83 700.25,616.5 684.38,613.26 C682.86,612.95 691.25,586.13 692.06,570.64 C692.44,563.26 690.67,544.7 683.23,524.06 C667.77,481.12 615.5,466.25 609.58,417.31 C609.25,414.61 605.53,414.71 603.36,416.33z "
            fill={fill}
            fillOpacity="1"
            fillRule="nonzero"
          >
            <animate
              attributeName="d"
              attributeType="XML"
              begin="0s"
              calcMode="spline"
              dur="0.9333333s"
              fill="freeze"
              from="M603.36 416.33 C581,433 586.63,450.25 583.86,466.55 C583.19,470.47 577.75,469.25 576.54,465.71 C559.5,447 549.55,423.61 559.33,394.37 C577.25,340.75 614.25,311.25 594.16,288.45 C590.97,284.83 591.83,284.26 590.22,288.82 C572.5,339 363,338 427.98,536 C430.85,544.77 430.25,555.25 429.51,565.8 C429.28,568.95 427.08,571.32 424.17,570.12 C401.5,560.75 395.38,525.75 390.42,516.28 C389,513.58 387.5,514.5 385.67,517.95 C381.03,524.07 377.94,532.3 374.2,538.54 C336.92,600.69 343.58,664.33 368.03,714.96 C368.94,716.86 369.89,718.74 370.85,720.6 C371.93,722.68 373.05,724.75 374.19,726.79 C391.8,758.26 416.04,783.76 439.75,799.32 C442.6,801.19 446.26,798.52 445.29,795.24 C437.07,767.62 642.75,744.75 634.67,795.2 C634.12,798.62 637.29,801.28 640.2,799.38 C659.88,786.47 680.25,766.82 695.21,741.99 C696.41,740.01 697.57,737.99 698.7,735.93 C699.47,734.52 700.23,733.09 700.97,731.65 C711.2,711.65 717.8,688.75 718.09,663.65 C718.33,643.75 714.58,622.45 705.52,600.11 C703.78,595.83 700.25,616.5 684.38,613.26 C682.86,612.95 691.25,586.13 692.06,570.64 C692.44,563.26 690.67,544.7 683.23,524.06 C667.77,481.12 615.5,466.25 609.58,417.31 C609.25,414.61 605.53,414.71 603.36,416.33z "
              keySplines="0.333 0 0.667 1;0.333 0 0.667 1;0.333 0 0.667 1;0.333 0 0.667 1;0.333 0 0.667 1;0.333 0 0.667 1;0.333 0 0.667 1;0.333 0 0.667 1;0.333 0 0.667 1;0.333 0 0.667 1;0.333 0 0.833 1;0.167 0 0.833 1;0.167 0 0.833 1;0.167 0 0.833 1"
              keyTimes="0;0.0714286;0.1428571;0.2142857;0.2857143;0.3571429;0.4285714;0.5;0.5714286;0.6428571;0.7142857;0.7857143;0.8571429;0.9285714;1"
              repeatCount="indefinite"
              to="M565.86 356.45 C565.86,356.45 575.61,343.8 575.61,343.8 C575.61,343.8 580.5,337.25 587.54,330.08 C590.75,325.75 598.25,315.51 601.2,307 C602.5,303.25 603.29,298.23 601.66,294.2 C599.75,289.5 597.81,292.24 596.09,293.82 C584.5,304.5 564.64,310.04 557.6,312.75 C534.25,321.75 520.74,324.12 503.38,333.43 C493,339 472.55,352.75 472.55,352.75 C472.55,352.75 456.17,365.53 456.17,365.53 C456.17,365.53 437.67,384.33 437.67,384.33 C437.67,384.33 422.5,403.75 417.94,425.86 C408.75,473.5 420,492 430.95,528.61 C434.5,547.5 436.13,555.3 430.81,558.78 C425.5,562.25 407.5,546.5 392.02,502.88 C281.5,654.5 410,785 439.75,799.32 C442.82,800.8 445.93,798.6 445.29,795.24 C438,757 639.75,751.5 634.67,795.2 C634.27,798.64 637.45,801.51 640.2,799.38 C677.68,770.21 748,703.5 705.8,598.01 C694,611.5 682.57,610.99 682.57,610.99 C682.57,610.99 691.19,577.81 691.51,565.5 C692.5,528 681.3,506.78 648.86,474.1 C615,440 598.75,433 601.52,410.11 C572.5,424 593,463 580.51,462.38 C574,461.25 570,458.51 566.68,453.64 C562.5,447.5 550.41,431.35 550.98,408.31 C551.25,397.25 556.58,375.81 556.58,375.81 C556.58,375.81 565.86,356.45 565.86,356.45z "
              values="M603.36 416.33 C581,433 586.63,450.25 583.86,466.55 C583.19,470.47 577.75,469.25 576.54,465.71 C559.5,447 549.55,423.61 559.33,394.37 C577.25,340.75 614.25,311.25 594.16,288.45 C590.97,284.83 591.83,284.26 590.22,288.82 C572.5,339 363,338 427.98,536 C430.85,544.77 430.25,555.25 429.51,565.8 C429.28,568.95 427.08,571.32 424.17,570.12 C401.5,560.75 395.38,525.75 390.42,516.28 C389,513.58 387.5,514.5 385.67,517.95 C381.03,524.07 377.94,532.3 374.2,538.54 C336.92,600.69 343.58,664.33 368.03,714.96 C368.94,716.86 369.89,718.74 370.85,720.6 C371.93,722.68 373.05,724.75 374.19,726.79 C391.8,758.26 416.04,783.76 439.75,799.32 C442.6,801.19 446.26,798.52 445.29,795.24 C437.07,767.62 642.75,744.75 634.67,795.2 C634.12,798.62 637.29,801.28 640.2,799.38 C659.88,786.47 680.25,766.82 695.21,741.99 C696.41,740.01 697.57,737.99 698.7,735.93 C699.47,734.52 700.23,733.09 700.97,731.65 C711.2,711.65 717.8,688.75 718.09,663.65 C718.33,643.75 714.58,622.45 705.52,600.11 C703.78,595.83 700.25,616.5 684.38,613.26 C682.86,612.95 691.25,586.13 692.06,570.64 C692.44,563.26 690.67,544.7 683.23,524.06 C667.77,481.12 615.5,466.25 609.58,417.31 C609.25,414.61 605.53,414.71 603.36,416.33z ;M582.73 405.08 C570.25,418.13 575,437 577.98,450.42 C578.84,454.3 571.63,453.38 568.42,449.83 C551.38,431.13 536.25,409.75 544.33,377.62 C558.11,322.79 604.5,314.5 595.78,294.58 C595.38,293.75 593.88,294.25 592.72,294.94 C558.5,313 366.25,321.5 431.98,502.5 C435.13,511.17 439.5,528.5 437.26,543.3 C436.78,546.42 434.27,548.22 431.42,546.87 C410.38,536.88 413.8,510.85 400.92,492.41 C399.5,490.38 397.88,491 396.17,494.08 C392.06,499.62 386.24,513.14 382.69,518.61 C332.18,596.46 339.54,665.51 366.08,717.22 C367.08,719.16 368.1,721.07 369.15,722.96 C370.32,725.08 371.53,727.17 372.76,729.22 C391.82,760.97 417.68,785.12 439.75,799.32 C442.62,801.17 446.26,798.52 445.29,795.24 C437.07,767.62 638,739 634.67,795.2 C634.46,798.66 637.29,801.28 640.2,799.38 C659.88,786.47 682.96,764.43 699.8,736.15 C701.14,733.89 702.45,731.59 703.71,729.25 C704.58,727.63 705.43,726 706.26,724.35 C717.69,701.53 724.73,675.29 723.11,646.94 C721.83,624.45 715.09,600.63 700.77,576.11 C698.44,572.12 690.5,601.5 674.63,598.26 C673.11,597.95 679.5,573.5 680.06,556.14 C680.3,548.75 678.25,525.75 670.23,504.81 C653.9,462.19 605.25,449.5 587.2,404.56 C586.19,402.04 584.61,403.12 582.73,405.08z ;M562.98 393.83 C560.5,408.88 562.5,413.38 565.48,426.8 C566.34,430.68 560.38,428.88 557.17,425.33 C540.13,406.63 520.67,386.78 529.58,354.87 C542.63,308.13 572.38,309.75 575.66,292.83 C575.38,292.5 574,292.25 572.97,292.44 C530,291.5 365,313.25 443.35,488.63 C447.11,497.05 446.75,508 444.51,522.8 C444.03,525.92 440.37,528.61 437.67,527 C423.25,518.38 433.5,500.5 411.54,477.28 C409.84,475.48 407.5,477.13 408.05,480.45 C407.25,500.38 387.01,525.07 383.19,530.36 C341.25,588.5 336.25,642.5 358.7,694.36 C359.63,696.51 366.06,707.03 366.06,707.03 C366.06,707.03 364.13,709.38 360.27,710.13 C378.94,751.48 410.94,782.59 439.75,799.32 C442.7,801.04 446.26,798.52 445.29,795.24 C437.07,767.62 634.5,733.25 634.67,795.2 C634.68,798.67 637.29,801.28 640.2,799.38 C659.88,786.47 685.43,763.31 704,732.51 C705.48,730.05 706.92,727.54 708.31,724.98 C709.27,723.21 710.2,721.43 711.11,719.62 C723.66,694.57 731.14,665.28 727.83,632.9 C725.21,607.22 715.81,579.6 696.77,550.61 C694.23,546.75 684,585.5 661.13,584.26 C659.58,584.17 663.5,558 664.06,540.64 C664.3,533.25 659.08,499.08 648.98,479.06 C628.25,438 593.25,437 567.45,393.31 C566.07,390.97 563.42,391.15 562.98,393.83z ;M547.73 383.58 C547.13,392.88 547.63,393.88 548.98,401.67 C549.66,405.59 547.38,403.38 544.17,399.83 C527.13,381.13 510.96,362.31 515.83,329.12 C520.5,297.25 537.25,291 545.66,280.33 C545.38,280 546,277.88 541.22,277.94 C496.5,283 389,309.5 448.23,456 C451.69,464.55 452.25,488.88 450.01,503.68 C449.53,506.8 446.25,514.5 442.92,513 C435.25,507.37 447,494.38 425.04,471.16 C423.34,469.36 422,470.13 421.55,474.33 C420.75,494.25 389.71,531.22 385.69,536.36 C343.5,590.25 339.75,621 356.7,677.36 C358.57,683.56 367.81,698.28 367.81,698.28 C367.81,698.28 361.25,698.75 353.27,695.63 C365.5,744 410,785 439.75,799.32 C442.82,800.8 446.26,798.52 445.29,795.24 C437.07,767.62 639,733.38 634.67,795.2 C634.43,798.66 637.2,801.14 640.2,799.38 C675.67,778.46 703.35,745.16 718.73,706.96 C719.96,703.9 721.11,700.81 722.18,697.7 C722.92,695.55 723.62,693.39 724.28,691.22 C733.41,661.16 735.03,628.83 727.11,597.57 C720.83,572.78 708.55,548.66 689.27,526.86 C686.67,523.92 678.5,574.75 648.13,570.26 C644.35,569.7 651,543 650.06,520.89 C649.48,507.26 641.58,484.83 631.48,464.81 C610.75,423.75 582,423.5 550.95,382.81 C549.3,380.65 547.91,380.87 547.73,383.58z ;M541.98 380.83 C541.98,380.83 540.36,379.55 540.36,379.55 C540.36,379.55 538.88,376.38 535.67,372.83 C518.63,354.13 509,354 500.45,322.12 C492.48,292.4 511.69,271.91 512.03,269.95 C512.38,268 511,266.38 507.72,267.19 C459.75,283.5 413.75,321.75 453.6,418.88 C463.21,442.29 459.88,472.38 456.76,484.31 C455.96,487.35 451.75,496.63 448.42,495.12 C443.38,491 450.13,480.25 436.79,464.91 C435.17,463.04 433.75,463.88 433.3,468.08 C429.25,501.13 395.63,524.75 385.94,536.86 C343.19,590.3 348.5,618.75 357.7,656.36 C360.72,668.7 375.31,688.53 375.31,688.53 C375.31,688.53 361.75,692 347.77,683.13 C357,742.25 410,785 439.75,799.32 C442.82,800.8 446.26,798.52 445.29,795.24 C437.07,767.62 642,732 634.67,795.2 C634.27,798.64 637.18,801.11 640.2,799.38 C677.06,778.26 706.14,743.68 721.68,703 C722.92,699.75 724.08,696.45 725.14,693.12 C725.88,690.83 726.57,688.52 727.22,686.19 C736.2,653.99 736.84,618.81 726.57,583.92 C718.42,556.26 703.42,528.77 680.27,503.11 C673.25,502.25 661.88,561.5 634.26,559.88 C627,554.5 636.25,519 630.43,494.14 C627.25,479.25 620.4,457.58 606.73,439.81 C579.75,404.75 577.5,410.63 542.58,374.93 C540.68,372.99 541.98,380.83 541.98,380.83z ;M545.36 362.95 C545.36,362.95 540.98,359.8 540.98,359.8 C540.98,359.8 538,357.38 535.29,355.33 C515.88,337.38 498.91,334.76 485.45,304.62 C478.25,288.5 481.19,270.16 481.53,268.2 C481.88,266.25 481.75,264 479.47,265.44 C453.25,285.5 426.75,302 462.6,394.88 C471.72,418.49 468.75,454.5 464.51,467.18 C463.51,470.17 460.38,483.25 457.05,481.75 C452,477.63 457.5,468 447.29,455.91 C445.7,454.01 444.25,454.88 443.8,459.08 C439.75,492.13 405.75,513 385.69,535.86 C356,564.75 351.5,600 362.95,642.61 C366.25,654.88 380.81,678.03 380.81,678.03 C380.81,678.03 359,677.75 345.02,668.88 C348.5,738.5 410,785 439.75,799.32 C442.82,800.8 446.26,798.52 445.29,795.24 C437.07,767.62 642,732 634.67,795.2 C634.27,798.64 637.18,801.11 640.2,799.38 C677.06,778.26 706.62,742.6 721.89,699.83 C723.11,696.41 724.24,692.94 725.27,689.44 C725.99,687.02 726.65,684.58 727.28,682.13 C735.88,648.12 735.61,610.55 723.35,572.72 C713.63,542.71 696.37,512.55 670.02,483.86 C663,483 649.75,552.25 624.01,545.88 C614,538 621.25,497.75 615.43,472.89 C612.25,458 604.16,433.8 592.23,414.81 C572.25,383 551.7,367.81 551.7,367.81 C551.7,367.81 545.36,362.95 545.36,362.95z ;M557.11 354.7 C557.11,354.7 550.61,350.05 550.61,350.05 C550.61,350.05 543.38,344.38 539.04,341.58 C515.5,326.5 500.73,324.64 477.45,301.25 C467.88,291.63 463.13,283.5 463.03,276.45 C463.01,274.47 463.13,272.25 460.84,273.69 C437.5,300.5 455.5,331.5 476.6,385.88 C485.76,409.47 479.25,434 475.01,446.68 C474.01,449.67 470.13,463.75 466.8,462.25 C463.5,460.63 464.88,453 461.67,448.41 C460.25,446.38 458.25,447.38 457.8,451.58 C446.5,485 423.75,494 403.69,516.86 C374,545.75 358.5,586.5 369.95,629.11 C373.25,641.38 387.81,664.53 387.81,664.53 C387.81,664.53 367.5,669.5 344.02,651.88 C343.5,735.5 410,785 439.75,799.32 C442.82,800.8 446.26,798.52 445.29,795.24 C437.07,767.62 644.75,739.75 634.67,795.2 C634.05,798.61 637.18,801.11 640.2,799.38 C677.06,778.26 706.14,746.35 720.47,705.46 C721.61,702.18 722.67,698.86 723.62,695.47 C724.28,693.14 724.89,690.78 725.45,688.39 C733.24,655.35 731.89,617.21 718.29,574.78 C707.5,541.13 689.01,504.77 661.27,466.11 C654.25,465.25 638.5,533.25 615.76,528.38 C605.75,520.5 617.62,483.53 615.93,462.39 C614.25,441.25 611.91,424.3 599.98,405.31 C580,373.5 568.58,363.31 568.58,363.31 C568.58,363.31 557.11,354.7 557.11,354.7z ;M574.61 354.2 C574.61,354.2 562.36,345.05 562.36,345.05 C562.36,345.05 548.38,336.13 544.04,333.33 C520.5,318.25 511.5,318.75 477.45,301.25 C465.38,295.04 459.48,294.19 457.41,287.45 C456.5,284.5 454.13,286.38 453.59,289.07 C450.25,315.63 464.25,314.25 485.35,368.63 C494.51,392.22 488.38,418 484.13,430.68 C483.13,433.67 480.13,444.13 477.8,443.87 C476.18,443.7 476,441.13 474.92,439.16 C473.73,436.98 472.25,438 470.8,442.08 C455,473.5 426.5,490.5 406.44,513.36 C382.25,536 369,587 378.45,617.11 C382.26,629.23 391.31,652.53 391.31,652.53 C391.31,652.53 370.75,655.25 347.27,637.63 C340.5,728 410,785 439.75,799.32 C442.82,800.8 446.26,798.52 445.29,795.24 C437.07,767.62 644.75,739.75 634.67,795.2 C634.05,798.61 637.18,801.11 640.2,799.38 C680.21,776.46 711.17,737.07 721.85,688.05 C722.7,684.13 723.43,680.15 724.02,676.11 C724.42,673.32 724.76,670.51 725.04,667.67 C728.85,628.37 719.95,584 693.36,537.6 C679.28,513.05 669.5,475 663.52,455.86 C652.5,455.25 624.25,514.25 614.26,511.13 C608.75,505.75 617.25,483 619.18,461.39 C621.07,440.27 619.09,435.02 612.98,412.56 C607.25,391.5 588.83,369.56 588.83,369.56 C588.83,369.56 574.61,354.2 574.61,354.2z ;M580.86 347.2 C580.86,347.2 562.86,333.05 562.86,333.05 C562.86,333.05 552.13,327.38 547.79,324.58 C526.75,314.25 516.5,310.25 501.2,304.25 C488.56,299.29 481.75,299 472.41,295.45 C469.52,294.36 468.39,294.74 468.59,297.07 C470.25,315.75 484.75,320.5 498.85,362 C506.99,385.96 497.39,410.64 492.13,422.93 C487.88,432.88 477.3,444 477.3,444 C477.3,444 469.67,452.03 469.67,452.03 C469.67,452.03 460.67,460.83 460.67,460.83 C460.67,460.83 441.75,478.25 421.69,501.11 C393.25,532.75 382.25,556.25 385.45,603.61 C386.75,618.09 393.81,640.53 393.81,640.53 C393.81,640.53 382,650.5 356.02,620.38 C339.5,721 410,785 439.75,799.32 C442.82,800.8 445.62,798.64 445.29,795.24 C441.25,753.5 644.75,739.75 634.67,795.2 C634.05,798.61 637.28,801.27 640.2,799.38 C678.81,774.42 708.74,733.06 718.24,684.31 C719,680.41 719.63,676.47 720.12,672.48 C720.46,669.73 720.73,666.96 720.94,664.17 C723.81,625.57 713.86,583.37 685.86,541.6 C670.1,518.09 669.75,481 672.52,458.11 C633.75,465.5 624,498 614.01,494.88 C608.5,489.5 617.25,483 619.18,461.39 C621.07,440.27 622.34,425.27 616.23,402.81 C610.5,381.75 595.08,362.06 595.08,362.06 C595.08,362.06 580.86,347.2 580.86,347.2z ;M590.36 344.7 C590.36,344.7 578.36,332.3 578.36,332.3 C578.36,332.3 565.13,322.38 560.79,319.58 C539.75,309.25 542.75,310.5 527.45,304.5 C514.81,299.54 501.5,297 492.16,293.45 C489.27,292.36 488.6,294.6 489.34,296.82 C495.5,315.25 498,307.5 508.35,346 C514.92,370.44 505.5,400.5 494.63,416.93 C488.66,425.95 479.8,437 479.8,437 C479.8,437 472.17,445.03 472.17,445.03 C472.17,445.03 463.17,453.83 463.17,453.83 C463.17,453.83 455.25,461.25 435.19,484.11 C406.75,515.75 391.5,563.5 393.45,594.11 C394.75,608.59 397.81,632.03 397.81,632.03 C397.81,632.03 391,637.5 365.02,607.38 C337.5,712.5 410,785 439.75,799.32 C442.82,800.8 445.62,798.64 445.29,795.24 C441.25,753.5 642.5,748.75 634.67,795.2 C634.09,798.62 637.28,801.27 640.2,799.38 C678.81,774.42 707.13,732.19 715,682.86 C715.63,678.91 716.12,674.92 716.49,670.89 C716.74,668.11 716.92,665.31 717.04,662.5 C718.69,623.52 707.63,581.22 679.36,540.1 C659,510.5 665,479.75 667.77,456.86 C623.25,461.75 618,492.75 608.01,489.63 C602.5,484.25 610.5,473.5 612.43,451.89 C614.32,430.77 619.09,414.27 612.98,391.81 C607.25,370.75 600.08,360.31 600.08,360.31 C600.08,360.31 590.36,344.7 590.36,344.7z ;M593.11 339.2 C593.11,339.2 586.11,329.3 586.11,329.3 C586.11,329.3 578.63,318.88 574.29,316.08 C566.75,310 559.25,304 546.95,298.5 C534.56,292.95 528,290.25 518.66,286.7 C515.77,285.61 515.1,287.85 515.84,290.07 C522,308.5 522.25,311.75 522.85,336.25 C523.47,361.55 505.28,395.26 492.13,409.93 C484,419 476.05,429.25 476.05,429.25 C476.05,429.25 469.92,435.53 469.92,435.53 C469.92,435.53 463.42,442.58 463.42,442.58 C463.42,442.58 457.25,450 438.94,473.36 C413.75,508.75 403.75,541.5 402.7,574.86 C402.25,592.75 402.31,623.53 402.31,623.53 C402.31,623.53 389.5,622.25 373.27,588.88 C334,703 410,785 439.75,799.32 C442.82,800.8 445.62,798.64 445.29,795.24 C441.25,753.5 639.75,751.5 634.67,795.2 C634.27,798.64 637.45,801.51 640.2,799.38 C675.65,771.79 704.13,729.69 712.87,681.09 C713.57,677.2 714.14,673.27 714.58,669.3 C714.89,666.57 715.13,663.82 715.3,661.05 C717.72,622.71 707.63,581.22 679.36,540.1 C659,510.5 654,473.25 656.77,450.36 C612.25,455.25 609.5,488.25 599.51,485.13 C594,479.75 601.5,460.5 603.43,438.89 C605.32,417.77 613.09,400.27 606.98,377.81 C601.25,356.75 599.58,352.81 599.58,352.81 C599.58,352.81 593.11,339.2 593.11,339.2z ;M599.11 344.7 C599.11,344.7 597.86,337.05 597.86,337.05 C597.86,337.05 593.75,324.75 589.79,318.33 C586,313 580.25,301.75 568.45,293.5 C557.33,285.72 553.25,282.25 543.91,278.7 C541.02,277.61 540.34,279.86 541.09,282.07 C544.75,292.75 544.25,298.25 543.1,315 C541.37,340.25 522.78,363.01 509.63,377.68 C501.5,386.75 489.3,397.25 489.3,397.25 C489.3,397.25 476.92,410.03 476.92,410.03 C476.92,410.03 465.42,421.08 465.42,421.08 C465.42,421.08 457.75,431.5 439.44,454.86 C414.25,490.25 409.75,526.5 408.7,559.86 C410.5,579 407.31,612.53 407.31,612.53 C407.31,612.53 393.75,606.5 377.52,573.13 C325,691 410,785 439.75,799.32 C442.82,800.8 445.62,798.64 445.29,795.24 C441.25,753.5 639.75,751.5 634.67,795.2 C634.27,798.64 637.45,801.51 640.2,799.38 C677.68,770.21 708.86,716.82 715.3,659.01 C710.75,660 705.82,660.49 705.82,660.49 C705.82,660.49 711.75,644.25 713.01,632 C717.04,592.95 704.25,557.63 674.36,522.6 C648.65,492.48 642.75,463.75 645.52,440.86 C601,445.75 601.25,486.75 591.26,483.63 C585.75,478.25 584.75,476 586.68,454.39 C588.57,433.27 596.97,411.23 599.23,388.06 C600.5,375 601.33,361.81 601.33,361.81 C601.33,361.81 599.11,344.7 599.11,344.7z ;M596.11 355.2 C596.11,355.2 597.86,337.05 597.86,337.05 C597.86,337.05 598,328.5 597.54,320.58 C596.25,312.75 594,304.5 590.2,297.75 C588.55,294.81 580.25,280 570.91,276.45 C568.02,275.36 566.74,277.26 567.09,279.57 C569,292.25 563,305.75 559.6,312.25 C547.88,334.68 525.69,350.44 510.88,363.43 C500.25,372.75 492.55,378 492.55,378 C492.55,378 476.92,390.53 476.92,390.53 C476.92,390.53 463.42,402.58 463.42,402.58 C463.42,402.58 443.5,422 429.44,446.36 C406.5,483 410.5,519 412.95,551.61 C414.75,570.75 422.63,594.3 417.31,597.78 C412,601.25 395.25,594.25 379.77,550.63 C311.5,678 410,785 439.75,799.32 C442.82,800.8 445.62,798.64 445.29,795.24 C441.25,753.5 639.75,751.5 634.67,795.2 C634.27,798.64 637.45,801.51 640.2,799.38 C677.68,770.21 720.25,709.25 712.8,641.76 C706.75,644.75 698.82,643.49 698.82,643.49 C698.82,643.49 708.69,613.31 709.01,601 C710,563.5 704.3,545.78 671.86,513.1 C638,479 631.75,453 634.52,430.11 C590.25,434.75 595.5,483.5 585.51,480.38 C580,475 573,469.5 574.93,447.89 C576.82,426.77 578.75,421 581.23,408.81 C583.84,395.95 589.83,378.81 589.83,378.81 C589.83,378.81 596.11,355.2 596.11,355.2z ;M580.11 364.95 C580.11,364.95 588.61,349.8 588.61,349.8 C588.61,349.8 595.25,336.5 598.04,328.33 C600,323.5 601.5,316 601.2,307 C601.09,303.63 601,285.75 591.66,282.2 C588.77,281.11 587.99,282.26 588.34,284.57 C590.25,297.25 566.78,312.16 560.6,316.5 C539.25,331.5 528.74,337.62 511.38,346.93 C501,352.5 492.8,359.25 492.8,359.25 C492.8,359.25 476.92,370.03 476.92,370.03 C476.92,370.03 459.42,384.58 459.42,384.58 C459.42,384.58 441,403.5 426.94,427.86 C404,464.5 411.5,504.5 422.45,541.11 C424.25,560.25 429.13,578.8 423.81,582.28 C418.5,585.75 399.75,572.25 384.27,528.63 C292.5,659 410,785 439.75,799.32 C442.82,800.8 445.62,798.64 445.29,795.24 C441.25,753.5 639.75,751.5 634.67,795.2 C634.27,798.64 637.45,801.51 640.2,799.38 C677.68,770.21 734,700.75 709.8,620.51 C700.5,628.5 690.57,625.99 690.57,625.99 C690.57,625.99 701.19,598.81 701.51,586.5 C702.5,549 695.3,527.28 662.86,494.6 C629,460.5 616.75,444 619.52,421.11 C576.75,431.25 597,475.5 584.51,474.88 C578,473.75 568.5,459.25 566.68,453.64 C563.86,444.93 563.57,440.07 564.98,417.06 C565.5,408.5 573.33,383.31 573.33,383.31 C573.33,383.31 580.11,364.95 580.11,364.95z ;M565.86 356.45 C565.86,356.45 575.61,343.8 575.61,343.8 C575.61,343.8 580.5,337.25 587.54,330.08 C590.75,325.75 598.25,315.51 601.2,307 C602.5,303.25 603.29,298.23 601.66,294.2 C599.75,289.5 597.81,292.24 596.09,293.82 C584.5,304.5 564.64,310.04 557.6,312.75 C534.25,321.75 520.74,324.12 503.38,333.43 C493,339 472.55,352.75 472.55,352.75 C472.55,352.75 456.17,365.53 456.17,365.53 C456.17,365.53 437.67,384.33 437.67,384.33 C437.67,384.33 422.5,403.75 417.94,425.86 C408.75,473.5 420,492 430.95,528.61 C434.5,547.5 436.13,555.3 430.81,558.78 C425.5,562.25 407.5,546.5 392.02,502.88 C281.5,654.5 410,785 439.75,799.32 C442.82,800.8 445.93,798.6 445.29,795.24 C438,757 639.75,751.5 634.67,795.2 C634.27,798.64 637.45,801.51 640.2,799.38 C677.68,770.21 748,703.5 705.8,598.01 C694,611.5 682.57,610.99 682.57,610.99 C682.57,610.99 691.19,577.81 691.51,565.5 C692.5,528 681.3,506.78 648.86,474.1 C615,440 598.75,433 601.52,410.11 C572.5,424 593,463 580.51,462.38 C574,461.25 570,458.51 566.68,453.64 C562.5,447.5 550.41,431.35 550.98,408.31 C551.25,397.25 556.58,375.81 556.58,375.81 C556.58,375.81 565.86,356.45 565.86,356.45z "
            />
          </path>
        </g>

        <g transform=" translate(300, 470.504) scale(0.9650799999999999, 0.9650799999999999) translate(-510.283, -685.815)">
          <path
            d=" M410.06 771.87 C412.91,773.74 416.57,771.07 415.6,767.79 C407.38,740.17 411.54,708.64 427.68,684.63 C455.29,643.16 510.65,603.1 501.81,548.71 C501.24,545.26 505.31,542.99 507.87,545.36 C546.86,581 554.59,628.95 548.18,671.96 C547.63,675.7 552.32,677.69 554.68,674.76 C560.64,667.29 567.92,660.74 575.85,655.81 C577.82,654.59 580.46,655.52 581.21,657.72 C594.24,695.64 617.69,725.57 604.98,767.75 C603.97,771.07 607.6,773.83 610.51,771.93 C610.51,771.93 610.51,827.25 610.51,827.25 C610.51,827.25 410.06,827.25 410.06,827.25 C410.06,827.25 410.06,771.87 410.06,771.87z "
            fill={innerFillColor}
            fillOpacity="1"
            fillRule="nonzero"
          />
        </g>
      </g>
    </svg>
  );
}
