CREATE TABLE IF NOT EXISTS "counter" (
	"id" serial PRIMARY KEY NOT NULL,
	"count" integer DEFAULT 0,
	"updated_at" timestamp DEFAULT now() NOT NULL,
	"created_at" timestamp DEFAULT now() NOT NULL
);
