export default function ProjectOverview() {
  return (
    <section className="mb-12">
      <h2 className="text-xl font-semibold mb-4 text-green-800">1. Project Overview</h2>
      <div className="space-y-4">
        <p>
          The Baltimore Solar & Battery Service (BSBS) is a pioneering municipal utility model designed to deliver universal clean energy access to urban households. This notebook details the technical and operational framework for implementing the BSBS, focusing on achieving energy sovereignty for the city of Baltimore through a scalable, equitable, and sustainable approach.
        </p>
        <p>
          The core objective is to install solar and battery systems on 100,000 homes by 2030, providing residents with $0 upfront costs and predictable service fees.
        </p>
        <p>
          Baltimore City, with approximately 252,000–260,000 households and a population of around 560,000, faces high energy burdens in many neighborhoods. BSBS directly addresses this by leveraging city ownership of assets, bulk procurement, and integration with existing state programs such as the Maryland Solar Access Program (MSAP) and recent initiatives under Governor Moore's Lower Bills and Local Power Act.
        </p>
      </div>
    </section>
  )
}