Defines the logger type that H2O LLM Studio uses for model training

Options
- **None**
    - H2O LLM Studio does not use any logger.
- **Neptune**
    - H2O LLM Studio uses Neptune as a logger to track the experiment. To use Neptune, you must specify a **Neptune API token** and a **Neptune project**.